create table `ufutx_app_error_logs` (
    `id` bigint NOT NULL AUTO_INCREMENT,
    `user_id` bigint DEFAULT NULL COMMENT "用户id",
    `message` text DEFAULT NULL COMMENT "错误信息",
    `url` text DEFAULT NULL COMMENT "错误链接",
    `user_agent` varchar(100) COMMENT "代理",
    `headers` text COMMENT "请求头",
    `created_at` timestamp NULL DEFAULT NULL,
    `updated_at` timestamp NULL DEFAULT NULL, 
    PRIMARY KEY (`id`)
)ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='app错误日志';